ν v s. E fo r ^{23} 8U (t ot al ν )

10 -2 10 -1 10 0 10 1 10 2 10 3 10 4 10 5 10 6 10 7

0 1 2 3 4 5

Δν/νvs.Efor _{238}U(totalν)

10_{-2}10_{-1}10_010_110_210_310_410_510_610_7 0.0 0.2 0.4 0.6 0.8 1.0 1.2 1.4 1.6 1.8 Ordinatescalesare%relative standarddeviationandnu-bar.

Abscissascalesareenergy(eV).

CorrelationMatrix

0.0 0.2 0.4 0.6 0.8 1.0

0.0 -0.2 -0.4 -0.6 -0.8 -1.0

Δ ν/ ν vs .E fo r ^2 38 U (t ot al ν )

10 -2 10 -1 10 0 10 1 10 2 10 3 10 4 10 5 10 6 10 7

0. 0 0. 2 0. 4 0. 6 0. 8 1. 0 1. 2 1. 4 1. 6 1. 8

Δν/νvs.Efor _{238}U(delayedν)

10_{-2}10_{-1}10_010_110_210_310_410_510_610_7 0.0 0.5 1.0 1.5 2.0 2.5 3.0 3.5 4.0 Ordinatescaleis% relativestandarddeviation.

Abscissascalesareenergy(eV).

CorrelationMatrix

0.0 0.2 0.4 0.6 0.8 1.0

0.0 -0.2 -0.4 -0.6 -0.8 -1.0

Δ ν/ ν vs .E fo r ^2 38 U (t ot al ν )

10 -2 10 -1 10 0 10 1 10 2 10 3 10 4 10 5 10 6 10 7

0. 0 0. 2 0. 4 0. 6 0. 8 1. 0 1. 2 1. 4 1. 6 1. 8

Δν/νvs.Efor _{238}U(promptν)

10_{-2}10_{-1}10_010_110_210_310_410_510_610_7 0.0 0.2 0.4 0.6 0.8 1.0 1.2 1.4 1.6 1.8 Ordinatescaleis% relativestandarddeviation.

Abscissascalesareenergy(eV).

CorrelationMatrix

0.0 0.2 0.4 0.6 0.8 1.0

0.0 -0.2 -0.4 -0.6 -0.8 -1.0

ν v s. E fo r ^{23} 8U (d el ay ed ν )

10 -2 10 -1 10 0 10 1 10 2 10 3 10 4 10 5 10 6 10 7

0 10 20 30 40 50 *1 0^{-3}

Δν/νvs.Efor _{238}U(delayedν)

10_{-2}10_{-1}10_010_110_210_310_410_510_610_7 0.0 0.5 1.0 1.5 2.0 2.5 3.0 3.5 4.0 Ordinatescalesare%relative standarddeviationandnu-bar.

Abscissascalesareenergy(eV).

CorrelationMatrix

0.0 0.2 0.4 0.6 0.8 1.0

0.0 -0.2 -0.4 -0.6 -0.8 -1.0

ν v s. E fo r ^{23} 8U (p ro m pt ν )

10 -2 10 -1 10 0 10 1 10 2 10 3 10 4 10 5 10 6 10 7

0 1 2 3 4 5

Δν/νvs.Efor _{238}U(promptν)

10_{-2}10_{-1}10_010_110_210_310_410_510_610_7 0.0 0.2 0.4 0.6 0.8 1.0 1.2 1.4 1.6 1.8 Ordinatescalesare%relative standarddeviationandnu-bar.

Abscissascalesareenergy(eV).

CorrelationMatrix

0.0 0.2 0.4 0.6 0.8 1.0

0.0 -0.2 -0.4 -0.6 -0.8 -1.0