μ v s. E fo r ^{23} 8U (m t2 51 )

10 4

10 5

10 6

10 7

10 -2 10 -1 10 0

Δμ/μvs.Efor _{238}U(mt251)

10_4

10_5

10_6

10_7 0.0 0.5 1.0 1.5 2.0 2.5 3.0 3.5 4.0 Ordinatescalesare%relative standarddeviationandmu-bar.

Abscissascalesareenergy(eV).

CorrelationMatrix

0.0 0.2 0.4 0.6 0.8 1.0

0.0 -0.2 -0.4 -0.6 -0.8 -1.0