G rp -a ve ra ge ϕ (E in= 1. 23 M eV ), 2^5 2C f( n, f)

10 3

10 4

10 5

10 6

10 7

10 -1 2 10 -1 0 10 -8 10 -6

Δϕ/ϕvs.Efor _{252}Cf(n,f)

10_3

10_4

10_5

10_6

10_7 10_{-1}

10_0

10_1

10_2

Ordinatescalesare%standard deviationandspectrum/eV.

Abscissascalesareenergy(eV).

CorrelationMatrix

0.0 0.2 0.4 0.6 0.8 1.0

0.0 -0.2 -0.4 -0.6 -0.8 -1.0