Ground-state ε_3 correction

−ΔEε_3 (MeV)

−1.4

−1.2

−1.0

−0.8

−0.6

−0.4

−0.2

0.0

50 60 70 80 90 100 110 120 130 140 Neutron Number N

40 50 60 70 80 90 100

Proton Number Z