Beta-decay energies (odd-odd)

Q_β (MeV)

FRDM(2012)

2 4 6 8 10 12 14 16

0 20 40 60 80 100 120 140 160 180 200 Neutron Number N 0 20 40 60 80 100

120

140

Proton Number Z