odd-odd odd even

β^− decay (Th-2012: GT + ff)

Total Error = 2.25 for 118 nuclei, T_{β,exp} < 100 ms Total Error = 2.68 for 272 nuclei, T_{β,exp} < 1 s Total Error = 4.26 for 670 nuclei, T_{β,exp} < 1000 s

10^{− 3} 10^{− 2} 10^{− 1} 10^0 10^1 10^2 10^3 Experimental β-Decay Half-life T_{β,exp} (s)

10^{− 3}

10^{− 2}

10^{− 1}

10^0

10^1

10^2

10^3

10^4

T_{β,calc}/T_{β,exp}

odd-odd odd even

β^− decay (Th-2012: GT )

Total Error = 2.47 for 118 nuclei, T_{β,exp} < 100 ms Total Error = 3.28 for 272 nuclei, T_{β,exp} < 1 s Total Error =27.49 for 670 nuclei, T_{β,exp} < 1000 s

10^{− 3}

10^{− 2}

10^{− 1}

10^0

10^1

10^2

10^3

10^4

T_{β,calc}/T_{β,exp}