odd-odd odd even

Total Error = 2.93 for 51 nuclei, T_{β,exp} < 100 ms Total Error = 3.15 for 113 nuclei, T_{β,exp} < 1 s Total Error = 5.17 for 437 nuclei, T_{β,exp} < 1000 s

EC decay (Th-2012:)

10^{− 3} 10^{− 2} 10^{− 1} 10^0 10^1 10^2 10^3 Experimental EC-Decay Half-life T_{EC,exp} (s)

10^{− 3}

10^{− 2}

10^{− 1}

10^0

10^1

10^2

10^3

10^4

T_{β,calc}/T_{β,exp}