FRLDM (2012)

Experimental

Calculated

rms = 1.052 MeV

Discrepancy (Exp.−Calc.)

0 20 40 60 80 100 120 140 160 Neutron Number N

−10 0 0 10 20 30 40 0 10 20 30 40 50

Fission-Barrier Height (MeV)