μ_{730} = −0.2298 MeV σ_{730} = 0.7624 MeV σ_{1654} = 0.7786 MeV

FRLDM (1992)

New Masses in AME2012 Evaluation, Relative to 1989, Compared to Theory

−20 −15 −10 −5 0 5 10 15 Neutrons from β-stability

−6

−4

−2 0 2 4 6

Mass Difference M_{exp} − M_{th} (MeV)