Ground-State Quadrupole Deformation

|ε_2|

FRDM(2012)

0.05

0.10

0.15

0.20

0.25

0.30

0.35

0.40

0 20 40 60 80 100 120 140 160 180 200 Neutron Number N 0 20 40 60 80 100

120

140

Proton Number Z