Atomic Data and Nuclear Data Tables 98 (2012) 149-300

14 42Si_{28}

Scale 0.20 (MeV)

0.00 0.10 0.20 0.30 0.40 0

20

40

60

-1

0 0 0 1

2

Spheroidal Deformation ε_2