FRDM with 1970 Spin-Orbit and Range

σ_{th} = 0.691 MeV Exp. = AME2003

0 20 40 60 80 100 120 140 160 Neutron Number N

−5

−4

−3

−2

−1 0 1 2 3 4

FRDM-2007b (L = 0)

σ_{th} = 0.596 MeV Exp. = AME2003

−4

−3

−2

−1 0 1 2 3 4 5

Mass Difference M_{exp} − M_{th} (MeV)