Exp. = AME1989

Kruppa, rms = 2.34 MeV

FRDM(1992), rms = 1.41 MeV

35 40 45 50 55 Mass Number A

−2

−1 0 1 2 3 4 5

Mass Difference M_{exp} − M_{th} (MeV)