Saddle-Energy Difference

−5 −4 −3 −2 −1 0 1 2 ld pot

E^{sad} − E^{sad} (MeV)

100 110 120 130 140 150 160170 180 190 200 210 220 230 Neutron Number N 50 60 70 80 90 100

110

120

130

Proton Number Z