108 298Hs_{190}

Scale 0.40 (MeV)

0.00 0.10 0.20 0.30 0.40 0.50 0.60 0.70 0

20

40

60

-4 -2 0 2

2 4 6

8 8

Spheroidal Deformation ε_2