Number of Minima

Depth > 0.20 MeV, E_{ex} < 2.0 MeV, ε_2 < 0.45

1 2 3 4 5

0 20 40 60 80 100 120 140 160 Neutron Number N 0 20 40 60 80 100

120

Proton Number Z